; CompressonatorLib.def : Declares the module parameters for the DLL.

EXPORTS
    CMP_CalculateBufferSize
    CMP_ConvertTexture
    CMP_CreateBC6HEncoder
    CMP_CreateBC7Encoder
    CMP_EncodeBC7Block
    CMP_EncodeBC6HBlock
    CMP_DecodeBC6HBlock
    CMP_DecodeBC7Block
    CMP_DestroyBC6HEncoder
    CMP_DestroyBC7Encoder
    CMP_InitializeBCLibrary
    CMP_ShutdownBCLibrary
