; Compute_lib def : Declares the module parameters for the DLL.

EXPORTS
CMP_CalcMinMipSize
CMP_GenerateMIPLevels
CMP_CreateCompressMipSet
CMP_ParseFormat
CMP_CreateComputeLibrary
CMP_DestroyComputeLibrary
CMP_CompressTexture
CMP_SetComputeOptions
CMP_ProcessTexture
CMP_CreateBlockEncoder
CMP_DestroyBlockEncoder
CMP_CompressBlock
CMP_CompressBlockXY
CMP_GetMipLevel
CMP_FreeMipSet
CMP_LoadTexture
CMP_SaveTexture
CMP_NumberOfProcessors
